90 + 60 + 60
2 base units, 1 flex panel

Template name
Expand_Linkwall_Create_your_own_configuration_220cm
Specific information for this template file
•	Scale is 1:10 – Images should have a minimum resolution of 1000 dpi.
•	Bleed 1mm – Extend graphics and color plates over the red bleed
guidelines.
•	When saved to PDF be sure to choose Spreads (instead of Pages)  	in the dialogue box.
For best result
•	Use Adobe inDesign or Adobe illustrator
•	Read product specific information in the template file
•	Do not use overprint fill or stroke for text or graphics
•	Create outlines of your text
•	Deliver your artwork as a PDF.
For more artwork info
http://www.expandmedia.com/se/vara_produkter/att-skapa-original
Deliver your artwork
Files up to 10 Mb: e-mail to info@expandmedia.com
Files over 10 Mb: Upload to our FTP server http://ftpsv.expandmedia.com/EFTClient/Account/Login.htm and e-mail us the name of your file/folder. For user name & password to our FTP server, contact us at  info@expandmedia.com or +46 8 55 69 69 00.
For artwork service or questions
Contact us at info@expandmedia.com or +46 8 55 696 900. Our design team will help you create your artwork, do retouching jobs and graphics.

Flex panel

OK!

Base unit

NO!

Designing artwork for the Expand LinkWall
Use this template and add
pages using Adobe Indesign pages
window and then apply the preferred
master to the page.
Want to learn how to work with pages?
Go to AdobeTV http://tv.adobe.com or
google “multiple page sizes in indesign”
How to combine the components
Expand LinkWall consists of base units (with straight panels)
and flex panels in different heights.
A flex panel must have a base unit on both sides.
Two or more base units can be connected side by side.
End panels can be added to straight double-sided configurations.